From d1c0ccfcb84f1b8778e38b027a333d03e1f4ae9e Mon Sep 17 00:00:00 2001
From: jloup <jloup@jloup.work>
Date: Sun, 13 May 2018 15:02:48 +0100
Subject: Account information panel.

---
 cmd/web/js/main.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'cmd/web/js/main.jsx')

diff --git a/cmd/web/js/main.jsx b/cmd/web/js/main.jsx
index dfc3337..7fa2d26 100644
--- a/cmd/web/js/main.jsx
+++ b/cmd/web/js/main.jsx
@@ -4,7 +4,7 @@ import PasswordResetForm from './password_reset.js';
 import ChangePasswordForm from './change_password.js';
 import OtpEnrollForm from './otp.js';
 import PoloniexController from './poloniex.js';
-import PoloniexConfiguration from './account.js';
+import UserAccount from './account.js';
 import App from './app.js';
 import Api from './api.js';
 import cookies from './cookies.js';
@@ -97,7 +97,7 @@ App.page('/me', true, function(context) {
 
 App.page('/account', true, function(context) {
   App.mount(<div>
-      <PoloniexConfiguration/>
+      <UserAccount/>
     </div>);
 });
 
-- 
cgit v1.2.3

