en	This form should not contain extra fields.
und	Feltgruppen må ikke indeholde ekstra felter.

en	The uploaded file was too large. Please try to upload a smaller file.
und	Den oploadede fil var for stor. Opload venligst en mindre fil.

en	The CSRF token is invalid. Please try to resubmit the form.
und	CSRF nøglen er ugyldig.