From 33fe6a46a42ca1c13f2585b42d9da54aa2e45899 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Nicolas=20L=C5=93uillet?= <nicolas.loeuillet@gmail.com>
Date: Fri, 25 Oct 2013 14:20:18 +0200
Subject: bug fix #278: mysql collation not UTF8

---
 install/mysql.sql | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'install/mysql.sql')

diff --git a/install/mysql.sql b/install/mysql.sql
index cb232a84..9b01e32c 100644
--- a/install/mysql.sql
+++ b/install/mysql.sql
@@ -3,7 +3,7 @@ CREATE TABLE IF NOT EXISTS `config` (
   `name` varchar(255) NOT NULL,
   `value` varchar(255) NOT NULL,
   PRIMARY KEY (`id`)
-) ENGINE=InnoDB DEFAULT CHARSET=latin1;
+) ENGINE=InnoDB DEFAULT CHARSET=utf8;
 
 CREATE TABLE IF NOT EXISTS `entries` (
   `id` int(11) NOT NULL AUTO_INCREMENT,
@@ -14,7 +14,7 @@ CREATE TABLE IF NOT EXISTS `entries` (
   `content` blob NOT NULL,
   `user_id` int(11) NOT NULL,
   PRIMARY KEY (`id`)
-) ENGINE=InnoDB  DEFAULT CHARSET=latin1;
+) ENGINE=InnoDB  DEFAULT CHARSET=utf8;
 
 CREATE TABLE IF NOT EXISTS `users` (
   `id` int(11) NOT NULL AUTO_INCREMENT,
@@ -23,7 +23,7 @@ CREATE TABLE IF NOT EXISTS `users` (
   `name` int(255) NOT NULL,
   `email` varchar(255) NOT NULL,
   PRIMARY KEY (`id`)
-) ENGINE=InnoDB  DEFAULT CHARSET=latin1;
+) ENGINE=InnoDB  DEFAULT CHARSET=utf8;
 
 CREATE TABLE IF NOT EXISTS `users_config` (
   `id` int(11) NOT NULL AUTO_INCREMENT,
@@ -31,4 +31,4 @@ CREATE TABLE IF NOT EXISTS `users_config` (
   `name` varchar(255) NOT NULL,
   `value` varchar(255) NOT NULL,
   PRIMARY KEY (`id`)
-) ENGINE=InnoDB  DEFAULT CHARSET=latin1;
\ No newline at end of file
+) ENGINE=InnoDB  DEFAULT CHARSET=utf8;
\ No newline at end of file
-- 
cgit v1.2.3

