From da6e676d6e42bb3e9a9feb212e152904330cff10 Mon Sep 17 00:00:00 2001
From: Gabe Cook <gabe565@gmail.com>
Date: Thu, 25 Jun 2020 17:54:18 -0500
Subject: :lipstick: Add fa-fw to icons by default to fix variable width icons

Fixes #93
---
 src/components/Navbar.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/Navbar.vue')

diff --git a/src/components/Navbar.vue b/src/components/Navbar.vue
index d3ceaf8..c688a3a 100644
--- a/src/components/Navbar.vue
+++ b/src/components/Navbar.vue
@@ -29,7 +29,7 @@
               <i
                 v-if="link.icon"
                 style="margin-right: 6px;"
-                :class="link.icon"
+                :class="['fa-fw', link.icon]"
               ></i>
               {{ link.name }}
             </a>
-- 
cgit v1.2.3

