From c80854cb2d1e4ee0f96e8e5185b466b6c06c5416 Mon Sep 17 00:00:00 2001
From: Bastien Wirtz <bastien.wirtz@gmail.com>
Date: Sun, 5 Jun 2022 21:48:10 +0200
Subject: Make connectivity check work with vitejs dev server

Head requests on directory path end up in 404
---
 src/components/ConnectivityChecker.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/components/ConnectivityChecker.vue')

diff --git a/src/components/ConnectivityChecker.vue b/src/components/ConnectivityChecker.vue
index 2b3e47b..3066b7d 100644
--- a/src/components/ConnectivityChecker.vue
+++ b/src/components/ConnectivityChecker.vue
@@ -56,7 +56,7 @@ export default {
 
       // extra check to make sure we're not offline
       let that = this;
-      const aliveCheckUrl = window.location.href + "?t=" + new Date().valueOf();
+      const aliveCheckUrl = `${window.location.origin}${window.location.pathname}/index.html?t=${new Date().valueOf()}`;
       return fetch(aliveCheckUrl, {
         method: "HEAD",
         cache: "no-store",
-- 
cgit v1.2.3

