From 239ef1688df3f3e1233d819a0cf809cdb0a6d379 Mon Sep 17 00:00:00 2001
From: Gabe Cook <gabe565@gmail.com>
Date: Wed, 22 Jul 2020 15:06:26 -0500
Subject: :bug: Remove fa-fw from main logo to fix Font Awesome duotone issues

---
 src/App.vue | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/App.vue')

diff --git a/src/App.vue b/src/App.vue
index d7054a7..5f52c8f 100644
--- a/src/App.vue
+++ b/src/App.vue
@@ -14,7 +14,7 @@
         <div v-cloak class="container">
           <div class="logo">
             <img v-if="config.logo" :src="config.logo" alt="dashboard logo" />
-            <i v-if="config.icon" :class="['fa-fw', config.icon]"></i>
+            <i v-if="config.icon" :class="config.icon"></i>
           </div>
           <div class="dashboard-title">
             <span class="headline">{{ config.subtitle }}</span>
-- 
cgit v1.2.3

